= Reversing of the AsRock X570 Phantom Gaming 4 firmware image

== Steps
1. download fw 
2. binwalk


== Mappings
=== 4456808
Compressed lzma
Contains boot images

|===
| Start, Length, Type, Description
| 4456808, 15525, LZMA Archive, Boot splash images
|===
4456808 = lzma = jpg images 
4591952 = lzma = windows pe binaries - unknown usage
4633968 = lzma = win-pe bins, aes-s box 
